Time, ns

0 1000 2000 3000 4000 5000 6000

Aμ Signal Current,

0 10 20 30 40

GADC counts above pedestal

0

100

200

300 s drifter-2013-09-30-17-26-05.dat μ Iter: 430103876, Time 400022.2061 EvntNo: 30, Peak: 17.033, Stepn: 17.033 Ceren: 221.2 Ratio: 0.0770 php3: 255.4989 Hstry1: 337.7

Time, ms

-20 -15 -10 -5 0

Filled bunches - 10 turn Average

0

200

400 r = 0.42 for EMEC; SimNo = 45; parms = 1 EMEC 1.31 1200 0.25 1500 0.001 0.100 1.000 0.10 128 0 7 2 0 0 First spread-out bunches